% (gH)   -_-  demosweave1.rnw  ;  TimeStamp (unix) : 31 Mai 2010 vers 14:33
\documentclass[a4paper]{article}
%
\def\ghversion{2.31}
\usepackage[latin1]{inputenc}
\input dctgh.tex % ma mise en page
\lhead{\textbf{Gilles HUNAULT}}
\chead{}
\rhead{D\'{e}monstration Sweave}
%
\lfoot{Version \ghversion}
\cfoot{page\ ~\thepage\ ~/~ \pageref{LastPage}}
\rfoot{\today\ ;\ \timenow}                    
\usepackage{Sweave}
\begin{document}
\input{demosweave1-concordance}

~

\begin{center}
{\LARGE
PRODUCTION DYNAMIQUE DE \\[0.5cm]
\textsc{DOCUMENTS,} \\[0.5cm]
\textsc{STATISTIQUES} \\[0.5cm]
\textsc{ET GRAPHIQUES} \\[3cm]
}%
\end{center}


\section{Quelques lignes de donn\'{e}es du fichier : iris }

Le fichier elf contient 150 lignes. L'utilisateur
INRA veut
traiter les 10 premi\`{e}res lignes de ce fichier.
Voici les premi\`{e}res lignes et les derni\`{e}res lignes du fichier :

\begin{Schunk}
\begin{Soutput}
  Sepal.Length Sepal.Width Petal.Length Petal.Width Species
1          5.1         3.5          1.4         0.2  setosa
2          4.9         3.0          1.4         0.2  setosa
3          4.7         3.2          1.3         0.2  setosa
4          4.6         3.1          1.5         0.2  setosa
5          5.0         3.6          1.4         0.2  setosa
6          5.4         3.9          1.7         0.4  setosa
..
    Sepal.Length Sepal.Width Petal.Length Petal.Width   Species
145          6.7         3.3          5.7         2.5 virginica
146          6.7         3.0          5.2         2.3 virginica
147          6.3         2.5          5.0         1.9 virginica
148          6.5         3.0          5.2         2.0 virginica
149          6.2         3.4          5.4         2.3 virginica
150          5.9         3.0          5.1         1.8 virginica
\end{Soutput}
\end{Schunk}

\newpage

\section{Quelques calculs pour le fichier :  iris }

\begin{Schunk}
\begin{Soutput}
  Sepal.Length    Sepal.Width     Petal.Length    Petal.Width   
 Min.   :4.300   Min.   :2.000   Min.   :1.000   Min.   :0.100  
 1st Qu.:5.100   1st Qu.:2.800   1st Qu.:1.600   1st Qu.:0.300  
 Median :5.800   Median :3.000   Median :4.350   Median :1.300  
 Mean   :5.843   Mean   :3.057   Mean   :3.758   Mean   :1.199  
 3rd Qu.:6.400   3rd Qu.:3.300   3rd Qu.:5.100   3rd Qu.:1.800  
 Max.   :7.900   Max.   :4.400   Max.   :6.900   Max.   :2.500  
             Sepal.Length Sepal.Width Petal.Length Petal.Width
Sepal.Length    1.0000000  -0.1175698    0.8717538   0.8179411
Sepal.Width    -0.1175698   1.0000000   -0.4284401  -0.3661259
Petal.Length    0.8717538  -0.4284401    1.0000000   0.9628654
Petal.Width     0.8179411  -0.3661259    0.9628654   1.0000000

Matrice des corrélations au sens de  Pearson pour  150  lignes et  4  colonnes

             Sepal.Length Sepal.Width Petal.Length Petal.Width
Sepal.Length        1.000                                     
Sepal.Width        -0.118       1.000                         
Petal.Length        0.872      -0.428        1.000            
Petal.Width         0.818      -0.366        0.963       1.000
\end{Soutput}
\end{Schunk}

\newpage

\section{Quelques graphiques pour le fichier :  iris }

\includegraphics{demosweave1-004}

\includegraphics{demosweave1-005}

\includegraphics{demosweave1-006}

\includegraphics{demosweave1-007}

\end{document}
